Friedenau (Berlin)
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Friedenau
location: Berlin, 52.472222 13.327778
identifier: 4138088-5