Hotel Bristol (Wien)
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Hotel Bristol
location: Kärntner Ring 5-7
Wien
48.2021236 16.3705539
identifier: 10116821-4