Hilton Paris Opera (Paris)
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Hilton Paris Opera; Hotel Concorde Saint-Lazare; Grand Hotel Terminus; The Gramd Club Central; Grand Hotel terminus; 108, rue Saint-Lazare
location: 75008 Paris
identifier: …
identifier: 10283077