Hotel Great Central (London)
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Hotel Great Central
location: 222 Marylebone Road
London
51.5217 -0.1628
1899 durch die britische Eisenbahngesellschaft Great Central Railway eröffnetes Luxushotel