Philip Josef van Wouvermans
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Wouvermans, Philip Josef van
birth: 1878, Krainburg
death: 1913-04-12, Wien
occupation: Ingenieur