Henri Wilhelm Petri
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Petri, Henri Wilhelm
identifier: 116133872
birth: 1856-04-05, Zeist
death: 1914-04-07, Dresden
occupation: Geiger
occupation: Konzertmeister