Hans von Bülow
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Bülow, Hans von; Hans Guido Freiherr von Bülow
identifier: 118664638
identifier: 89610488
identifier: 0000000121430438
birth: 1830-01-08, Dresden
death: 1894-02-12, Kairo
occupation: Dirigent
occupation: Pianist
occupation: Komponist
affiliation: Chefdirigent der Berliner Philharmoniker