Harold Bauer
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Bauer, Harold; Harold Victor Bauer
birth: 1873-04-28, Kingston upon Thames
death: 1951-03-12, Miami
identifier: 134831969
identifier: 100985888
identifier: 0000000087329490
occupation: Pianist
occupation: Geiger