Rheinfelden
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Rheinfelden
location: 47.55427 7.79394
identifier: 4049753-7
identifier: 2659060