Louvre (Paris)
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Louvre
location: Rue de Rivoli
Paris
48.8625 2.336389
identifier: 1006837-5
identifier: 6269531